#!/usr/bin/env python

###
### READ ME!
###
### This is an example file to help you define a new
### server that uses the standard CGI method of accepting
### new URLs.  Just change the text in quotes as neccesary.
### If you are stumped as to what to put, then view the HTML
### source on the site's URL submission page.
###
### Copy this file to yourcoolserver.def and edit it.  Any line
### that starts with a # is a comment and will be ignored.
###

config = Configuration()

###
### CONFIGURE THIS SERVER STARTING HERE
###

# This identifying name is used throughout Pagecast
config.name = "Infoseek"

config.mailto = "www-request@infoseek.com"
config.subject = "URL Submission"

###
### NO USER-SERVICEABLE PARTS BELOW
###

import generic, serverbase

# make sure we are using a unique name
config.name = serverbase.FindUniqueName(ServerRegister, config.name)

ServerRegister[config.name] = serverbase.ThreadBase(G, config.name, generic.GenericMail(G, config.name, config))

